From e9c64de3b7d5959ec3efeab50b9eb4e35fe60168 Mon Sep 17 00:00:00 2001
From: Charadon <dev@iotib.net>
Date: Wed, 5 Oct 2022 17:32:08 -0400
Subject: manual.tex: Replaced Platform Specifics with Quirks

---
 manual.tex | 9 +++++++--
 1 file changed, 7 insertions(+), 2 deletions(-)

(limited to 'manual.tex')

diff --git a/manual.tex b/manual.tex
index 623e866..459d1ef 100644
--- a/manual.tex
+++ b/manual.tex
@@ -24,7 +24,7 @@ This is the manual for the Dead Simple Continuous Integration POSIX program.
 @menu
 * Installing::
 * Using::
-* Platform Specifics::
+* Quirks::
 
 * Index::
 @end menu
@@ -292,7 +292,12 @@ set MSYSTEM=MINGW64
 			checksum on itself. If it's different from when it first launched,
 			It'll re-run itself. This is useful for manual installations.
 
-@node Platform Specifics
+@node Quirks
+@chapter Quirks
+@cindex Quirks
+	This chapter goes over various quirks that have been discovered with DSCIP.
+	None so far...
+	
 
 @node Index
 @unnumbered Index
-- 
cgit 1.4.1-2-gfad0

